X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3e43d6143ba737da833e58b8f51eb400d374cb00..763b330106e9d3c9c198fc1b1cac4e1ca06c222f:/docs/latex/wx/stopwtch.tex?ds=inline

diff --git a/docs/latex/wx/stopwtch.tex b/docs/latex/wx/stopwtch.tex
index 473f4ec299..f80cf86175 100644
--- a/docs/latex/wx/stopwtch.tex
+++ b/docs/latex/wx/stopwtch.tex
@@ -25,7 +25,7 @@ use it to measure the time elapsed by some function:
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxStopWatch::wxStopWatch}
+\membersection{wxStopWatch::wxStopWatch}\label{wxstopwatchctor}
 
 \func{}{wxStopWatch}{\void}
 
@@ -55,7 +55,7 @@ Resumes the stop watch which had been paused with
 
 (Re)starts the stop watch with a given initial value.
 
-\membersection{wxStopWatch::Time}
+\membersection{wxStopWatch::Time}\label{wxstopwatchtime}
 
 \constfunc{long}{Time}{\void}\label{wxstopwatchtime}
 
