X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3dd9b88ac26caa8dbcc26c7fafc10cd886fc97ac..e195c8c95fb154d035bab400952fc81c62439549:/docs/latex/wx/frame.tex

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 29c31e7c3b..d4bd5a33a1 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -594,3 +594,4 @@ This function has not been tested with MDI frames.
 \wxheading{See also}
 
 \helpref{wxFrame::IsFullScreen}{wxframeisfullscreen}
+
