X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3db5226517a63bcdc983e638f1a312764fe1312f..b8b37cedd39bae3a3653003a7f8ae5fecf4df78f:/docs/latex/wx/helpinst.tex?ds=sidebyside

diff --git a/docs/latex/wx/helpinst.tex b/docs/latex/wx/helpinst.tex
index 9e660aab5d..01ef4f3eb1 100644
--- a/docs/latex/wx/helpinst.tex
+++ b/docs/latex/wx/helpinst.tex
@@ -90,9 +90,9 @@ Destroys the help instance, closing down the viewer if it is running.
 
 \membersection{wxHelpController::Initialize}\label{wxhelpcontrollerinitialize}
 
-\func{virtual void}{Initialize}{\param{const wxString\& }{file}}
+\func{virtual bool}{Initialize}{\param{const wxString\& }{file}}
 
-\func{virtual void}{Initialize}{\param{const wxString\& }{file}, \param{int}{ server}}
+\func{virtual bool}{Initialize}{\param{const wxString\& }{file}, \param{int}{ server}}
 
 Initializes the help instance with a help filename, and optionally a server socket
 number if using wxHelp (now obsolete). Does not invoke the help viewer.
