X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3d3428c4e6c415cb31824f9d6087d8de8e51cabc..fd495ab3ea1282ddb8bb0cd0fb79fc758ae5fcee:/docs/latex/wx/plotwindow.tex?ds=sidebyside

diff --git a/docs/latex/wx/plotwindow.tex b/docs/latex/wx/plotwindow.tex
index 9b49449087..8a2e7bc227 100644
--- a/docs/latex/wx/plotwindow.tex
+++ b/docs/latex/wx/plotwindow.tex
@@ -14,7 +14,7 @@ of the curves, enlarging them or scrolling from one position to another. Note
 that this window is not useful for real-time measuring or for displaying charts
 with error bars etc.
 
-A single curve in the plot window is represented by the \helpref{wxPlotCurve}{wxplotcurve}
+A single curve in the plot window is represented by the \helpref{wxPlotCurve}{wxplotcurve} 
 class.
 
 The wxPlotWindow interacts with program using events, for example when clicking
