X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3ca6a5f04692678cd2d9f3ea0843fc3f5a0b254f..bbc3925a8a46e8c80b22277f5571dfb2465aca25:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 486ae32798..d5c0824faa 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -399,8 +399,6 @@ Returns the default separator size.
 
 Returns the short help for the given tool.
 
-Returns the long help for the given tool.
-
 \wxheading{Parameters}
 
 \docparam{toolId}{The tool in question.}
