X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3c70014d966bbfa08d201ca24c825f2d88cc3975..65baafba0e8cd74f2264b7e2f7625ff5bea84864:/docs/latex/wx/strmbase.tex?ds=inline

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 70ba8506d7..8c495730c3 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -47,7 +47,7 @@ Destructor.
 \constfunc{wxFileOffset}{GetLength}{\void}
 
 Returns the length of the stream in bytes. If the length cannot be determined
-(this is always the case for socket streams for example), returns
+(this is always the case for socket streams for example), returns 
 \texttt{wxInvalidOffset}.
 
 \newsince{2.5.4}
@@ -94,7 +94,7 @@ Returns true if no error occurred on the stream.
 \helpref{GetLastError}{wxstreambasegetlasterror}
 
 
-\membersection{wxStreamBase::IsSeekable}\label{wxstreambaseisok}
+\membersection{wxStreamBase::IsSeekable}\label{wxstreambaseisseekable}
 
 \constfunc{bool}{IsSeekable}{\void}
 
@@ -131,4 +131,3 @@ real position.
 
 See \helpref{OnSysRead}{wxstreambaseonsysread}.
 
-
