X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3aa8e4ea6db0478d3bc862f59f100408bdc8732f..b3a029f0bbf8262cfe30914790802f88608ea618:/docs/latex/wx/wizard.tex

diff --git a/docs/latex/wx/wizard.tex b/docs/latex/wx/wizard.tex
index 59c8e1e034..412017a28d 100644
--- a/docs/latex/wx/wizard.tex
+++ b/docs/latex/wx/wizard.tex
@@ -29,7 +29,7 @@ Finally, don't forget to call {\tt wizard->Destroy()}, otherwise your applicatio
 You can supply a bitmap to display on the left of the wizard, either for all pages
 or for individual pages. If you need to have the bitmap resize to the height of the wizard,
 call \helpref{wxWizard::SetBitmapPlacement}{wxwizardsetbitmapplacement} and if necessary,\rtfsp
-\helpref{wxWizard::SetBitmapBackgroundColour}{wxwizardsetbitmapbackgroundcolour} and \helpref{wxWizard::SetMinimumBitmapWidth}{wxwizardsetminimumbitmapheight}.
+\helpref{wxWizard::SetBitmapBackgroundColour}{wxwizardsetbitmapbackgroundcolour} and \helpref{wxWizard::SetMinimumBitmapWidth}{wxwizardsetminimumbitmapwidth}.
 
 To make wizard pages scroll when the display is too small to fit the whole dialog, you can switch
 layout adaptation on globally with \helpref{wxDialog::EnableLayoutAdaptation}{wxdialogenablelayoutadaptation} or
