X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3a40452d789a6279a7223d2539e8e780ba31c6a4..fa4bc07cceb7dd42099e1b8227423d7f4ee034b2:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index 4039407671..64f28a1e5f 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -26,11 +26,11 @@
 
 Initializes a new read-only memory stream which will use the specified buffer
 {\it data} of length {\it len}. The stream does not take ownership of the 
-buffer, i.e. that it will not delete in its destructor.
+buffer, i.e. the buffer will not be deleted in its destructor.
 
 \func{}{wxMemoryInputStream}{\param{const wxMemoryOutputStream&}{ stream}}
 
-Creates a new read-only memory stream, initilalizing it with the
+Creates a new read-only memory stream, initializing it with the
 data from the given output stream \arg{stream}.
 
 \membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}\label{wxmemoryinputstreamdtor}
