X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/39d663394811d826b78fc9ef2c553b852b341da9..6e42617af493da590f7d08ed248be615ab817eee:/docs/latex/wx/tsamples.tex?ds=sidebyside

diff --git a/docs/latex/wx/tsamples.tex b/docs/latex/wx/tsamples.tex
index 5068d20e1c..002e375756 100644
--- a/docs/latex/wx/tsamples.tex
+++ b/docs/latex/wx/tsamples.tex
@@ -118,13 +118,6 @@ The various controls tested are listed here:
 \end{twocollist}
 
 
-\subsection{Database sample}\label{sampledb}
-
-The database sample is a small test program showing how to use the ODBC
-classes written by Remstar Intl.  Obviously, this sample requires a
-database with ODBC support to be correctly installed on your system.
-
-
 \subsection{DebugRpt sample}\label{sampledebugrpt}
 
 This sample shows how to use \helpref{wxDebugReport}{wxdebugreport} class to
