X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3980000ca63a479b7b30ca93c07edbf12e4a51b7..faa9724741b39e6b08c8cec7139b811434e68132:/docs/latex/wx/dc.tex

diff --git a/docs/latex/wx/dc.tex b/docs/latex/wx/dc.tex
index 461c52f0c5..ef70d00a79 100644
--- a/docs/latex/wx/dc.tex
+++ b/docs/latex/wx/dc.tex
@@ -193,6 +193,15 @@ wxUSE\_DC\_CACHEING preprocessor symbol for portability.
 \end{comment}
 
 
+\membersection{wxDC::ComputeScaleAndOrigin}\label{wxdccomputescaleandorigin}
+
+\func{virtual void}{ComputeScaleAndOrigin}{\void}
+
+Performs all necessary computations for given platform and context type
+after each change of scale and origin parameters. Usually called automatically 
+internally after such changes.
+
+
 \membersection{wxDC::CrossHair}\label{wxdccrosshair}
 
 \func{void}{CrossHair}{\param{wxCoord}{ x}, \param{wxCoord}{ y}}
@@ -1106,7 +1115,7 @@ Sets the user scaling factor, useful for applications which require
 \func{bool}{StartDoc}{\param{const wxString\& }{message}}
 
 Starts a document (only relevant when outputting to a printer).
-Message is a message to show whilst printing.
+Message is a message to show while printing.
 
 
 \membersection{wxDC::StartPage}\label{wxdcstartpage}
