X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3980000ca63a479b7b30ca93c07edbf12e4a51b7..213ad8e72cb6e838d15bf54145d661b081dca308:/docs/latex/wx/listbox.tex?ds=inline

diff --git a/docs/latex/wx/listbox.tex b/docs/latex/wx/listbox.tex
index 2f84df930c..649ba91e59 100644
--- a/docs/latex/wx/listbox.tex
+++ b/docs/latex/wx/listbox.tex
@@ -10,7 +10,7 @@ selections).
 List box elements are numbered from zero. Their number is limited in
 some platforms (e.g. ca. 2000 on GTK).
 
-A listbox callback gets an event wxEVT\_COMMAND\_LISTBOX\_SELECT for single clicks, and
+A listbox callback gets an event wxEVT\_COMMAND\_LISTBOX\_SELECTED for single clicks, and
 wxEVT\_COMMAND\_LISTBOX\_DOUBLE\_CLICKED for double clicks.
 
 \wxheading{Derived from}
@@ -201,9 +201,9 @@ parameter for wxPython, which is a list of strings.}
 \perlnote{In wxPerl there is just an array reference in place of {\tt nItems}
 and {\tt items}.}
 
-\membersection{wxListBox::Selected}\label{wxlistboxselected}
+\membersection{wxListBox::IsSelected}\label{wxlistboxisselected}
 
-\constfunc{bool}{Selected}{\param{int}{ n}}
+\constfunc{bool}{IsSelected}{\param{int}{ n}}
 
 Determines whether an item is selected.
 
