X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3980000ca63a479b7b30ca93c07edbf12e4a51b7..0836334e9fce54fc370314f9d27a513cda9291fa:/docs/latex/wx/htmlstrt.tex?ds=sidebyside

diff --git a/docs/latex/wx/htmlstrt.tex b/docs/latex/wx/htmlstrt.tex
index 988df7d19c..5708f5daf2 100644
--- a/docs/latex/wx/htmlstrt.tex
+++ b/docs/latex/wx/htmlstrt.tex
@@ -15,12 +15,10 @@ passed {\bf string}. See the example:
     mywin -> LoadPage("test.htm");
     mywin -> SetPage("<html><body>"
                      "<h1>Error</h1>"
-		     "Some error occurred :-H)"
-		     "</body></hmtl>");
+                     "Some error occurred :-H)"
+                     "</body></hmtl>");
 \end{verbatim}
 
-I think the difference is quite clear.
-
 \wxheading{Displaying Help}
 
 See \helpref{wxHtmlHelpController}{wxhtmlhelpcontroller}.
