X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/392751754e224616f01ce454830177b7a2b24b2b..f98488c8ca626661a4f414bdf38f45254fecb03e:/docs/latex/wx/sashwin.tex

diff --git a/docs/latex/wx/sashwin.tex b/docs/latex/wx/sashwin.tex
index 4b589a6fc5..bff4b340e3 100644
--- a/docs/latex/wx/sashwin.tex
+++ b/docs/latex/wx/sashwin.tex
@@ -131,7 +131,7 @@ Gets the minimum window size in the x direction.
 
 \membersection{wxSashWindow::GetMinimumSizeY}\label{wxsashwindowgetminimumsizey}
 
-\constfunc{int}{GetMinimumSizeY}{\param{int}{ min}}
+\constfunc{int}{GetMinimumSizeY}{\void}
 
 Gets the minimum window size in the y direction.
 
