X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/390015c0ee28d25b0b7e23c42a52733adcac334f..a729c3447523809786607aa3c62b17059b2c7842:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 2ebf4e4d97..648019282d 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -97,7 +97,7 @@ Returns the size and position of a fields internal bounding rectangle.
 
 \wxheading{Return value}
 
-TRUE if the field index is valid, FALSE otherwise.
+true if the field index is valid, false otherwise.
 
 \wxheading{See also}
 
@@ -143,7 +143,7 @@ strings.
 
 \membersection{wxStatusBar::PushStatusText}\label{wxstatusbarpushstatustext}
 
-\func{void}{PushStatusText}{\param{const wxString&}{ string}, \param{int}{ field = 0}}
+\func{void}{PushStatusText}{\param{const wxString\&}{ string}, \param{int}{ field = 0}}
 
 Saves the current field text in a per field stack, and sets the field text
 to the string passed as argument.
