X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/387ebd3eb755ea6ca076708cfb25fe56249bf787..d1be6261e3403e69bbd5694df008f1edfda06eef:/docs/latex/wx/valtext.tex?ds=sidebyside

diff --git a/docs/latex/wx/valtext.tex b/docs/latex/wx/valtext.tex
index 0973e9df20..0928570119 100644
--- a/docs/latex/wx/valtext.tex
+++ b/docs/latex/wx/valtext.tex
@@ -55,8 +55,8 @@ checks if each input character is in the list (one character per list element),
 
 \docparam{valPtr}{A pointer to a wxString variable that contains the value. This variable
 should have a lifetime equal to or longer than the validator lifetime (which is usually
-determined by the lifetime of the window). If NULL, the validator uses its own internal
-storage for the value.}
+determined by the lifetime of the window). % If NULL, the validator uses its own internal storage for the value. NOT true
+}
 
 \membersection{wxTextValidator::\destruct{wxTextValidator}}
 
