X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/384c96533e84e102a64c5057823a20a7d043e338..027aa6fa77e5b4643d2296f63d6911beb496c5bc:/docs/latex/wx/valgen.tex?ds=sidebyside

diff --git a/docs/latex/wx/valgen.tex b/docs/latex/wx/valgen.tex
index d5a9c9b76d..d9c479852a 100644
--- a/docs/latex/wx/valgen.tex
+++ b/docs/latex/wx/valgen.tex
@@ -27,7 +27,7 @@ For more information, please see \helpref{Validator overview}{validatoroverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxGenericValidator::wxGenericValidator}\label{wxgenericvalidatorconstr}
+\membersection{wxGenericValidator::wxGenericValidator}\label{wxgenericvalidatorctor}
 
 \func{}{wxGenericValidator}{\param{const wxGenericValidator\&}{ validator}}
 
@@ -59,7 +59,7 @@ Constructor taking a wxArrayInt pointer. This will be used for wxListBox, wxChec
 should have a lifetime equal to or longer than the validator lifetime (which is usually
 determined by the lifetime of the window).}
 
-\membersection{wxGenericValidator::\destruct{wxGenericValidator}}
+\membersection{wxGenericValidator::\destruct{wxGenericValidator}}\label{wxgenericvalidatordtor}
 
 \func{}{\destruct{wxGenericValidator}}{\void}
 
