X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3755cfa64d2f5182ec88d9d0bf934769e0269d10..304b9d52cf2a01372ed0e83bd062812ad7d77c78:/docs/latex/wx/hthlpfrm.tex

diff --git a/docs/latex/wx/hthlpfrm.tex b/docs/latex/wx/hthlpfrm.tex
index c8bbe26441..49ca992bcc 100644
--- a/docs/latex/wx/hthlpfrm.tex
+++ b/docs/latex/wx/hthlpfrm.tex
@@ -178,7 +178,7 @@ the embedded window to be destroyed independently of the help controller.
 
 \wxheading{Include files}
 
-<wx/html/helpwin.h>
+<wx/html/helpwnd.h>
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
