X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/36edded90cf3d4d11dc55362b332733b79e8f54d..cc4a1ce1f58b46cb4c4d6a1319192062140b9373:/docs/latex/wx/strmzlib.tex

diff --git a/docs/latex/wx/strmzlib.tex b/docs/latex/wx/strmzlib.tex
index d905e63089..33ba7ee708 100644
--- a/docs/latex/wx/strmzlib.tex
+++ b/docs/latex/wx/strmzlib.tex
@@ -16,7 +16,7 @@ stream to get new compressed data.
 
 \wxheading{See also}
 
-\helpref{wxStreamBuffer}{wxstreamBuffer}, \helpref{wxInputStream}{wxinputstream}
+\helpref{wxInputStream}{wxinputstream}
 
 % -----------------------------------------------------------------------------
 % wxZlibOutputStream
@@ -24,7 +24,7 @@ stream to get new compressed data.
 \section{\class{wxZlibOutputStream}}\label{wxzliboutputstream}
 
 This stream compresses all data written to it, and passes the compressed data
-to the ``filtered'' stream.
+to the "filtered" stream.
 
 \wxheading{Derived from}
 
@@ -36,5 +36,16 @@ to the ``filtered'' stream.
 
 \wxheading{See also}
 
-\helpref{wxStreamBuffer}{wxstreamBuffer}, \helpref{wxOutputStream}{wxoutputstream}
+\helpref{wxOutputStream}{wxoutputstream}
 
+
+\latexignore{\rtfignore{\wxheading{Members}}}
+
+\membersection{wxZlibOutputStream::wxZlibOutputStream}
+
+\func{}{wxZlibOutputStream}{\param{wxOutputStream\&}{ stream},\param{int}{ level = -1}}
+
+Creates a new write-only compressed stream. {\it level} means level of 
+compression. It is number between 0 and 9 (including these values) where
+0 means no compression and 9 best but slowest compression. -1 is default
+value (currently equivalent to 6).
