X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/36edded90cf3d4d11dc55362b332733b79e8f54d..2ccd904b011982314b5278044ce5febdee9d7369:/docs/latex/wx/critsect.tex?ds=inline

diff --git a/docs/latex/wx/critsect.tex b/docs/latex/wx/critsect.tex
index 0851745cd8..83cf6fb8c7 100644
--- a/docs/latex/wx/critsect.tex
+++ b/docs/latex/wx/critsect.tex
@@ -1,7 +1,7 @@
 \section{\class{wxCriticalSection}}\label{wxcriticalsection}
 
-A critical section object is used for the same exactly purpose as 
-\helpref{mutexes}{wxMutex}. The only difference is that under Windows platform
+A critical section object is used for exactly the same purpose as 
+\helpref{mutexes}{wxmutex}. The only difference is that under Windows platform
 critical sections are only visible inside one process, while mutexes may be
 shared between processes, so using critical sections is slightly more
 efficient. The terminology is also slightly different: mutex may be locked (or
@@ -25,7 +25,7 @@ None.
 \wxheading{See also}
 
 \helpref{wxThread}{wxthread}, \helpref{wxCondition}{wxcondition}, 
-\helpref{wxMutexLocker}{wxmutexlocker}, \helpref{wxCriticalSection}{wxcriticalsection}
+\helpref{wxCriticalSectionLocker}{wxcriticalsectionlocker}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -39,7 +39,7 @@ Default constructor initializes critical section object.
 
 \func{}{\destruct{wxCriticalSection}}{\void}
 
-Destructor frees the ressources.
+Destructor frees the resources.
 
 \membersection{wxCriticalSection::Enter}\label{wxcriticalsectionenter}
 
