X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/36b3b54ad8431bca0fa53fa8acae5ba6d4c3e9c7..a2c75a028d9be8823231bb34e4b7a873da1b1f8f:/docs/latex/wx/stattext.tex?ds=sidebyside

diff --git a/docs/latex/wx/stattext.tex b/docs/latex/wx/stattext.tex
index 20854fadcd..81d1505b58 100644
--- a/docs/latex/wx/stattext.tex
+++ b/docs/latex/wx/stattext.tex
@@ -2,10 +2,6 @@
 
 A static text control displays one or more lines of read-only text.
 
-TODO: should a static text have a validator? E.g. if you wanted
-to use it to initialise the control with some text taken from
-the validator.
-
 \wxheading{Derived from}
 
 \helpref{wxControl}{wxcontrol}\\
@@ -13,6 +9,10 @@ the validator.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/stattext.h>
+
 \wxheading{Window styles}
 
 There are no special styles for this control.
