X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/34adc693b0bd700af0a76f41a5bbc490bcdcc54d..f61757b17c623137d439b3cbe34960f7ce1e9601:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index ee1ed4a498..7216744074 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -1378,7 +1378,7 @@ Now obsolete: use \helpref{wxWindow::Close}{wxwindowclose} instead.
 
 <wx/utils.h>
 
-\membersection{::wxSafeYield}{wxsafeyield}
+\membersection{::wxSafeYield}\label{wxsafeyield}
 
 \func{bool}{wxSafeYield}{\param{wxWindow*}{ win = NULL}}
 
@@ -1393,7 +1393,7 @@ Returns the result of the call to \helpref{::wxYield}{wxyield}.
 
 <wx/utils.h>
 
-\membersection{::wxEnableTopLevelWindows}{wxenabletoplevelwindows}
+\membersection{::wxEnableTopLevelWindows}\label{wxenabletoplevelwindows}
 
 \func{void}{wxEnableTopLevelWindow}{\param{bool}{ enable = TRUE}}
 
