X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/335f20cb00bf3000227ed32b7105e4f7653fc73b..401e3b6e5f50f15571b86297b5d1e3f55c473f6f:/docs/latex/wx/minifram.tex

diff --git a/docs/latex/wx/minifram.tex b/docs/latex/wx/minifram.tex
index cae6163125..4c16e08fee 100644
--- a/docs/latex/wx/minifram.tex
+++ b/docs/latex/wx/minifram.tex
@@ -76,10 +76,10 @@ always be displayed on top of the parent window on Windows.}
 \docparam{title}{The caption to be displayed on the frame's title bar.}
 
 \docparam{pos}{The window position. A value of (-1, -1) indicates a default position, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{size}{The window size. A value of (-1, -1) indicates a default size, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{style}{The window style. See \helpref{wxMiniFrame}{wxminiframe}.}
 
