X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/330d6fd06384c6a49d72696cb1da012bbb978132..2cb20bea55c193c991b1e4953597370c815717ad:/docs/latex/wx/strmzlib.tex

diff --git a/docs/latex/wx/strmzlib.tex b/docs/latex/wx/strmzlib.tex
index de17f381ce..ff8c49b720 100644
--- a/docs/latex/wx/strmzlib.tex
+++ b/docs/latex/wx/strmzlib.tex
@@ -16,7 +16,7 @@ stream to get new compressed data.
 
 \wxheading{See also}
 
-\helpref{wxStreamBuffer}{wxstreamBuffer}, \helpref{wxInputStream}{wxinputstream}
+\helpref{wxInputStream}{wxinputstream}
 
 % -----------------------------------------------------------------------------
 % wxZlibOutputStream
@@ -36,5 +36,5 @@ to the "filtered" stream.
 
 \wxheading{See also}
 
-\helpref{wxStreamBuffer}{wxstreamBuffer}, \helpref{wxOutputStream}{wxoutputstream}
+\helpref{wxOutputStream}{wxoutputstream}
 
