X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3203e334b04d8bb8fa3a2b93d01527117f7408ec..5e1fd3eb6103c8f91bcec37ddffe322b8ddbfaa5:/docs/latex/wx/dataviewmodel.tex

diff --git a/docs/latex/wx/dataviewmodel.tex b/docs/latex/wx/dataviewmodel.tex
index f658eb5574..4a00cfce13 100644
--- a/docs/latex/wx/dataviewmodel.tex
+++ b/docs/latex/wx/dataviewmodel.tex
@@ -119,28 +119,12 @@ Adds {\it notifier} to the internal list of notifers.
 
 See also \helpref{RemoveNotifier}{wxdataviewlistmodelremovenotifier}.
 
-\membersection{wxDataViewListModel::AddViewingColumn}\label{wxdataviewlistmodeladdviewingcolumn}
-
-\func{void}{AddViewingColumn}{\param{wxDataViewColumn* }{view\_column}, \param{unsigned int }{model\_column}}
-
-Used internally. Used for maintaining a list of
-\helpref{wxDataViewColumn}{wxdataviewcolumn} that
-display a certain column of this model.
-
 \membersection{wxDataViewListModel::Cleared}\label{wxdataviewlistmodelcleared}
 
 \func{bool}{virtual Cleared}{\void}
 
 Call this if all data in your model has been cleared.
 
-\membersection{wxDataViewListModel::GetColType}\label{wxdataviewlistmodelgetcoltype}
-
-\func{virtual wxString}{GetColType}{\param{unsigned int }{col}}
-
-Override this to indicate what type of data is stored in the
-column specified by {\it col}. This should return a string
-indicating the type of data as reported by \helpref{wxVariant}{wxvariant}.
-
 \membersection{wxDataViewListModel::GetColumnCount}\label{wxdataviewlistmodelgetcolumncount}
 
 \func{virtual unsigned int}{GetColumnCount}{\void}
@@ -148,6 +132,14 @@ indicating the type of data as reported by \helpref{wxVariant}{wxvariant}.
 Override this to indicate, how many columns the list
 model has.
 
+\membersection{wxDataViewListModel::GetColumnType}\label{wxdataviewlistmodelgetcolumntype}
+
+\func{virtual wxString}{GetColType}{\param{unsigned int }{col}}
+
+Override this to indicate what type of data is stored in the
+column specified by {\it col}. This should return a string
+indicating the type of data as reported by \helpref{wxVariant}{wxvariant}.
+
 \membersection{wxDataViewListModel::GetRowCount}\label{wxdataviewlistmodelgetrowcount}
 
 \func{virtual unsigned int}{GetRowCount}{\void}
@@ -171,14 +163,6 @@ Removes the notifier from the list of notifiers.
 
 See also \helpref{AddNotifier}{wxdataviewlistmodeladdnotifier}.
 
-\membersection{wxDataViewListModel::RemoveViewingColumn}\label{wxdataviewlistmodelremoveviewingcolumn}
-
-\func{void}{RemoveViewingColumn}{\param{wxDataViewColumn* }{column}}
-
-Used internally. Used for maintaining a list of
-\helpref{wxDataViewColumn}{wxdataviewcolumn} that
-display a certain column of this model.
-
 \membersection{wxDataViewListModel::RowAppended}\label{wxdataviewlistmodelrowappended}
 
 \func{virtual bool}{RowAppended}{\void}
