X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/31fd9b6bab1130c2f9b4247cf5116c4e8d35a17f..3da93aae505563c359f58b357e6c79cd117c5320:/docs/latex/wx/image.tex

diff --git a/docs/latex/wx/image.tex b/docs/latex/wx/image.tex
index b77ec8f799..f913b2b6ba 100644
--- a/docs/latex/wx/image.tex
+++ b/docs/latex/wx/image.tex
@@ -49,7 +49,7 @@ PNM format, {\bf wxPNMHandler} will always save as raw RGB.
 
 \wxheading{See also}
 
-\helpref{wxBitmap}{wxbitmap}
+\helpref{wxBitmap}{wxbitmap}, 
 \helpref{wxInitAllImageHandlers}{wxinitallimagehandlers}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
@@ -505,6 +505,16 @@ Returns the (modified) image itself.
 
 \helpref{Scale}{wximagescale}
 
+\membersection{wxImage::Rotate}\label{wximagererotate}
+
+\func{wxImage}{Rotate}{\param{double}{ angle}, \param{const wxPoint\& }{rotationCentre},
+ \param{bool}{ interpolating = TRUE}, \param{wxPoint*}{ offsetAfterRotation = NULL}}
+
+Rotates the image about the given point, by {\it angle} radians. Passing TRUE
+to {\it interpolating} results in better image quality, but is slower.
+
+Returns the rotated image, leaving this image intact.
+
 \membersection{wxImage::Scale}\label{wximagescale}
 
 \constfunc{wxImage}{Scale}{\param{int}{ width}, \param{int}{ height}}
