X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/31a7f7c5eaceb18124d995e0e618823e66cefda9..0597e7f977c87d107e24bf3e95ebfa3d60efc249:/docs/latex/wx/listctrl.tex

diff --git a/docs/latex/wx/listctrl.tex b/docs/latex/wx/listctrl.tex
index 98942762b6..a3ef301c66 100644
--- a/docs/latex/wx/listctrl.tex
+++ b/docs/latex/wx/listctrl.tex
@@ -40,8 +40,9 @@ in \helpref{wxListEvent}{wxlistevent}.
 
 {\bf Mac Note:} Starting with 2.8, wxListCtrl uses a native implementation for 
 report mode, and uses a generic implementation for other modes. You can use the
-generic implementation for report mode as well by setting the 
-mac.listctrl.always_use_generic \helpref{wxSystemOption}{wxsystemoptions} to 1.
+generic implementation for report mode as well by setting the
+mac.listctrl.always\_use\_generic \helpref{wxSystemOption}{wxsystemoptions} to
+1.
 
 \wxheading{Derived from}
 
