X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/315ebf688c0e69bed47cd3149158198b781b5f65..0c4f1b2a1e1d50773feea21b46f933883bad728c:/src/os2/wx25.def

diff --git a/src/os2/wx25.def b/src/os2/wx25.def
index ea187e4c2a..f073efc3c9 100644
--- a/src/os2/wx25.def
+++ b/src/os2/wx25.def
@@ -2299,8 +2299,8 @@ EXPORTS
       wxStripExtension__FPc
       ;wxPathOnly(const wxString&)
       wxPathOnly__FRC8wxString
-      ;wxPathExists(const char*)
-      wxPathExists__FPCc
+      ;wxDirExists(const char*)
+      wxDirExists__FPCc
       ;wxPathList::FindValidPath(const wxString&)
       FindValidPath__10wxPathListFRC8wxString
       ;wxPathList::FindAbsoluteValidPath(const wxString&)
@@ -13919,8 +13919,8 @@ EXPORTS
       wxDrawBorder__FUlR6_RECTLT1
       ;wxShutdown(wxShutdownFlags)
       wxShutdown__F15wxShutdownFlags
-      ;wxPathExists(const wxString&)
-      wxPathExists__FRC8wxString
+      ;wxDirExists(const wxString&)
+      wxDirExists__FRC8wxString
       ;wxGetWindowText(unsigned long)
       wxGetWindowText__FUl
       ;wxGetWindowId(unsigned long)
@@ -14262,7 +14262,7 @@ EXPORTS
       DoMoveWindow__8wxWindowFiN31
       ;wxWindow::DoClientToScreen(int*,int*) const
       DoClientToScreen__8wxWindowCFPiT1
-      ;wxWindowBase::FindFocus()
+      ;wxWindowBase::DoFindFocus()
       FindFocus__12wxWindowBaseFv
       ;wxWindow::OS2OnDrawItem(int,void**)
       OS2OnDrawItem__8wxWindowFiPPv
