X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/3103e8a97e834e9793f0eb149aa82a99fd64ef9a..242019eef3fdcdb12b5310da67af3ef6d15e0f58:/docs/latex/wx/debugrpt.tex

diff --git a/docs/latex/wx/debugrpt.tex b/docs/latex/wx/debugrpt.tex
index c465dfb1df..df438049c0 100644
--- a/docs/latex/wx/debugrpt.tex
+++ b/docs/latex/wx/debugrpt.tex
@@ -51,6 +51,10 @@ No base class
 
 <wx/debugrpt.h>
 
+\wxheading{Library}
+
+\helpref{wxQa}{librarieslist}
+
 \wxheading{Data structures}
 
 This enum is used for functions that report either the current state
