X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/304b9d52cf2a01372ed0e83bd062812ad7d77c78..380a5dd80316202b472967e898feba1386ea5345:/docs/latex/wx/socket.tex

diff --git a/docs/latex/wx/socket.tex b/docs/latex/wx/socket.tex
index 04a2515b89..de3c5c5a88 100644
--- a/docs/latex/wx/socket.tex
+++ b/docs/latex/wx/socket.tex
@@ -127,7 +127,7 @@ Functions to retrieve current state and miscellaneous info.
 \helpref{IsDisconnected}{wxsocketbaseisdisconnected}\\
 \helpref{LastCount}{wxsocketbaselastcount}\\
 \helpref{LastError}{wxsocketbaselasterror}\\
-\helpref{Ok}{wxsocketbaseok}\\
+\helpref{IsOk}{wxsocketbaseisok}\\
 \helpref{SaveState}{wxsocketbasesavestate}\\
 \helpref{RestoreState}{wxsocketbaserestorestate}
 
@@ -414,11 +414,11 @@ be sent to the application. If {\it notify} is false; no events
 will be sent.
 
 % 
-% Ok
+% IsOk
 %
-\membersection{wxSocketBase::Ok}\label{wxsocketbaseok}
+\membersection{wxSocketBase::IsOk}\label{wxsocketbaseisok}
 
-\constfunc{bool}{Ok}{\void}
+\constfunc{bool}{IsOk}{\void}
 
 Returns true if the socket is initialized and ready and false in other
 cases.
