X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2fe90784aea58f2b36b22aca7a2df3cb8a42e52a..de414223ab83187113388a167dc5fa391cc9e166:/docs/latex/wx/vlbox.tex

diff --git a/docs/latex/wx/vlbox.tex b/docs/latex/wx/vlbox.tex
index 6cff3f552d..81e19d5966 100644
--- a/docs/latex/wx/vlbox.tex
+++ b/docs/latex/wx/vlbox.tex
@@ -43,6 +43,10 @@ string of an item.
 
 <wx/vlbox.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxSimpleHtmlListBox}{wxsimplehtmllistbox}, \helpref{wxHtmlListBox}{wxhtmllistbox}
@@ -334,7 +338,7 @@ This method is only valid for multi selection listboxes.
 Set the number of items to be shown in the control.
 
 This is just a synonym for
-\helpref{wxVScrolledWindow::SetLineCount()}{wxvscrolledwindowsetlinecount}.
+\helpref{wxVScrolledWindow::SetRowCount()}{wxvarvscrollhelpersetrowcount}.
 
 
 \membersection{wxVListBox::SetMargins}\label{wxvlistboxsetmargins}
