X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2fa7c206f68655f226e37ce1f1cc7e646e6c0bf2..e195c8c95fb154d035bab400952fc81c62439549:/docs/latex/wx/plotcurve.tex

diff --git a/docs/latex/wx/plotcurve.tex b/docs/latex/wx/plotcurve.tex
index b3d16de55a..a6c375b4db 100644
--- a/docs/latex/wx/plotcurve.tex
+++ b/docs/latex/wx/plotcurve.tex
@@ -79,7 +79,7 @@ return 0.5 or maybe 1.0 for nicer aesthetics.
 \func{void}{SetOffsetY}{\param{int }{offsetY}}
 
 When displaying several curves in one window, it is often useful to assign
-different offsets to the curves. You should call \helpref{wxPlotWindow::Move}{wxplotwindowmove}
+different offsets to the curves. You should call \helpref{wxPlotWindow::Move}{wxplotwindowmove} 
 to set this value after you have added the curve to the window.
 
 \membersection{wxPlotCurve::SetStartY}\label{wxplotcurvesetstarty}
