X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..f080251d92086deb8444531148ade820e5749de2:/docs/latex/wx/datostrm.tex?ds=sidebyside

diff --git a/docs/latex/wx/datostrm.tex b/docs/latex/wx/datostrm.tex
index d06d31cec2..5cb53a3467 100644
--- a/docs/latex/wx/datostrm.tex
+++ b/docs/latex/wx/datostrm.tex
@@ -23,13 +23,22 @@ None
 
 \func{}{wxDataOutputStream}{\param{wxOutputStream\&}{ stream}}
 
+\func{}{wxDataOutputStream}{\param{wxOutputStream\&}{ stream}, \param{wxMBConv\&}{ conv = wxMBConvUTF8}}
+
 Constructs a datastream object from an output stream. Only write methods will
-be available.
+be available. The second form is only available in Unicode build of wxWindows.
 
 \wxheading{Parameters}
 
 \docparam{stream}{The output stream.}
 
+\docparam{conv}{Charset conversion object object used to encoding Unicode 
+strings before writing them to the stream
+in Unicode mode (see \helpref{wxDataOutputStream::WriteString}{wxdataoutputstreamwritestring}
+documentation for detailed description). Note that you must not destroy
+{\it conv} before you destroy this wxDataOutputStream instance! It is
+recommended to use default value (UTF-8).}
+
 \membersection{wxDataOutputStream::\destruct{wxDataOutputStream}}
 
 \func{}{\destruct{wxDataOutputStream}}{\void}
@@ -40,7 +49,7 @@ Destroys the wxDataOutputStream object.
 
 \func{void}{BigEndianOrdered}{\param{bool}{ be\_order}}
 
-If {\it be\_order} is TRUE, all data will be written in big-endian
+If {\it be\_order} is true, all data will be written in big-endian
 order, e.g. for reading on a Sparc or from Java-Streams (which
 always use big-endian order), otherwise data will be written in
 little-endian order.
@@ -55,13 +64,19 @@ Writes the single byte {\it i8} to the stream.
 
 \func{void}{Write16}{{\param wxUint16 }{i16}}
 
-Writes the 16 bit integer {\it i16} to the stream.
+Writes the 16 bit unsigned integer {\it i16} to the stream.
 
 \membersection{wxDataOutputStream::Write32}
 
 \func{void}{Write32}{{\param wxUint32 }{i32}}
 
-Writes the 32 bit integer {\it i32} to the stream.
+Writes the 32 bit unsigned integer {\it i32} to the stream.
+
+\membersection{wxDataOutputStream::Write64}
+
+\func{void}{Write64}{{\param wxUint64 }{i64}}
+
+Writes the 64 bit unsigned integer {\it i64} to the stream.
 
 \membersection{wxDataOutputStream::WriteDouble}
 
@@ -69,10 +84,17 @@ Writes the 32 bit integer {\it i32} to the stream.
 
 Writes the double {\it f} to the stream using the IEEE format.
 
-\membersection{wxDataOutputStream::WriteString}
+\membersection{wxDataOutputStream::WriteString}\label{wxdataoutputstreamwritestring}
 
-\func{void}{WriteString}{{\param const wxString\& }{string}}
+\func{void}{WriteString}{{\param const wxString\&}{string}}
 
 Writes {\it string} to the stream. Actually, this method writes the size of
 the string before writing {\it string} itself.
 
+In ANSI build of wxWindows, the string is written to the stream in exactly
+same way it is represented in memory. In Unicode build, however, the string
+is first converted to multibyte representation with {\it conv} object passed
+to stream's constructor (consequently, ANSI application can read data 
+written by Unicode application, as long as they agree on encoding) and this
+representation is written to the stream. UTF-8 is used by default.
+
