X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..eedc82f4e96c7f8f0b24addbfd6b4429c9587631:/docs/latex/wx/settings.tex?ds=inline

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index c9f5edfe15..163b7c2a87 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -86,8 +86,10 @@ Returns a system font.
 \twocolitem{{\bf wxSYS\_ANSI\_VAR\_FONT}}{Windows variable-pitch (proportional) font.}
 \twocolitem{{\bf wxSYS\_SYSTEM\_FONT}}{System font.}
 \twocolitem{{\bf wxSYS\_DEVICE\_DEFAULT\_FONT}}{Device-dependent font (Windows NT only).}
-\twocolitem{{\bf wxSYS\_DEFAULT\_GUI\_FONT}}{Default font for user interface objects such as menus and dialog boxes.
-Not available in versions of Windows earlier than Windows 95 or Windows NT 4.0.}
+\twocolitem{{\bf wxSYS\_DEFAULT\_GUI\_FONT}}{Default font for user interface
+objects such as menus and dialog boxes. Note that with modern GUIs nothing
+guarantees that the same font is used for all GUI elements, so some controls
+might use a different font by default.}
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
