X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..e498079eb4bc94514b45b5b36fbdc7f8352c6c68:/docs/latex/wx/dllload.tex

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index 05dfd62573..4c54aae8e6 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -135,8 +135,8 @@ is valid. If the handle is valid, the library must be unloaded later with
 
 \docparam{libname}{Name of the shared object to load.}
 
-\docparam{success}{May point to a bool variable which will be set to TRUE or
-FALSE; may also be {\tt NULL}.}
+\docparam{success}{May point to a bool variable which will be set to true or
+false; may also be {\tt NULL}.}
 
 \membersection{wxDllLoader::UnloadLibrary}\label{wxdllloaderunloadlibrary}
 
