X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..dba7934c9d1b520ff7b48cd0d80cc52f8be6a052:/docs/latex/wx/dllload.tex?ds=sidebyside

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index 05dfd62573..c0f217dfd2 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -11,6 +11,11 @@
 
 \section{\class{wxDllLoader}}\label{wxdllloader}
 
+\textbf{Deprecation note: } This class is deprecated since version 2.4 and is
+not compiled in by default in version 2.6 and will be removed in 2.8. Please
+use \helpref{wxDynamicLibrary}{wxdynamiclibrary} instead.
+
+
 wxDllLoader is a class providing an interface similar to Unix's {\tt
 dlopen()}. It is used by the wxLibrary framework and manages the actual
 loading of shared libraries and the resolving of symbols in them. There are no
@@ -108,7 +113,7 @@ This function resolves a symbol in a loaded DLL, such as a variable or
 function name.
 
 Returned value will be {\tt NULL} if the symbol was not found in the DLL or if
-an error occured.
+an error occurred.
 
 \wxheading{Parameters}
 
@@ -135,8 +140,8 @@ is valid. If the handle is valid, the library must be unloaded later with
 
 \docparam{libname}{Name of the shared object to load.}
 
-\docparam{success}{May point to a bool variable which will be set to TRUE or
-FALSE; may also be {\tt NULL}.}
+\docparam{success}{May point to a bool variable which will be set to true or
+false; may also be {\tt NULL}.}
 
 \membersection{wxDllLoader::UnloadLibrary}\label{wxdllloaderunloadlibrary}
 
