X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..d6c6a32321219a3a2961e7f1ee1a8d2d54dc5cdf:/docs/latex/wx/splitevt.tex

diff --git a/docs/latex/wx/splitevt.tex b/docs/latex/wx/splitevt.tex
index a3ba5731f0..7cf2b96e93 100644
--- a/docs/latex/wx/splitevt.tex
+++ b/docs/latex/wx/splitevt.tex
@@ -38,7 +38,7 @@ Processes a wxEVT\_COMMAND\_SPLITTER\_SASH\_POS\_CHANGED event.}
 \twocolitem{{\bf EVT\_SPLITTER\_UNSPLIT(id, func)}}{The splitter has been just
 unsplit. Processes a wxEVT\_COMMAND\_SPLITTER\_UNSPLIT event. This event can't
 be vetoed.}
-\twocolitem{{\bf EVT\_SPLITTER\_DOUBLECLICKED(id, func)}}{The sash was double
+\twocolitem{{\bf EVT\_SPLITTER\_DCLICK(id, func)}}{The sash was double
 clicked. The default behaviour is to unsplit the window when this happens
 (unless the minimum pane size has been set to a value greater than zero). This
 won't happen if you veto this event. Processes a
