X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..c8fce1a43c78a54eefcbe4fad2048d3f6ee09855:/docs/latex/wx/http.tex?ds=sidebyside

diff --git a/docs/latex/wx/http.tex b/docs/latex/wx/http.tex
index 00879c582b..71b6829217 100644
--- a/docs/latex/wx/http.tex
+++ b/docs/latex/wx/http.tex
@@ -17,6 +17,14 @@
 % ----------------------------------------------------------------------------
 
 % ----------------------------------------------------------------------------
+\membersection{wxHTTP::GetResponse}\label{wxhttpgetresponse}
+
+\constfunc{int}{GetResponse}{\void}
+
+Returns the HTTP response code returned by the server. Please refer to the RFC
+2616 for the list of the responses.
+
+
 \membersection{wxHTTP::GetInputStream}\label{wxhttpgetinputstream}
 
 \func{wxInputStream *}{GetInputStream}{\param{const wxString\&}{ path}}
