X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..8a094d7ba9913333b49f8561d97b8309d0023663:/docs/latex/wx/htcell.tex

diff --git a/docs/latex/wx/htcell.tex b/docs/latex/wx/htcell.tex
index 6733cfabc5..bb10e8d0c7 100644
--- a/docs/latex/wx/htcell.tex
+++ b/docs/latex/wx/htcell.tex
@@ -45,7 +45,7 @@ should not be crossed by words, images etc.). If this cell cannot be divided
 into two pieces (each one on another page) then it moves the pagebreak
 few pixels up.
 
-Returns TRUE if pagebreak was modified, FALSE otherwise
+Returns true if pagebreak was modified, false otherwise
 
 Usage: 
 \begin{verbatim}
@@ -224,8 +224,8 @@ you should use wxHtmlBinderCell instead.
 
 \docparam{x, y}{coordinates of mouse click (this is relative to cell's origin}
 
-\docparam{left, middle, right}{boolean flags for mouse buttons. TRUE if the left/middle/right
-button is pressed, FALSE otherwise}
+\docparam{left, middle, right}{boolean flags for mouse buttons. true if the left/middle/right
+button is pressed, false otherwise}
 
 \membersection{wxHtmlCell::SetId}\label{wxhtmlcellsetid}
 
