X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..82e94f591f2638b07a4f28c096d94ec7e8571c20:/docs/latex/wx/colour.tex

diff --git a/docs/latex/wx/colour.tex b/docs/latex/wx/colour.tex
index 06171474d8..6e52405916 100644
--- a/docs/latex/wx/colour.tex
+++ b/docs/latex/wx/colour.tex
@@ -106,7 +106,7 @@ Returns the green intensity.
 
 \constfunc{bool}{Ok}{\void}
 
-Returns TRUE if the colour object is valid (the colour has been initialised with RGB values).
+Returns true if the colour object is valid (the colour has been initialised with RGB values).
 
 \membersection{wxColour::Red}\label{wxcolourred}
 
@@ -169,7 +169,7 @@ This class holds a variety of information related to colour dialogs.
 \func{}{wxColourData}{\void}
 
 Constructor. Initializes the custom colours to white, the {\it data colour} setting
-to black, and the {\it choose full} setting to TRUE.
+to black, and the {\it choose full} setting to true.
 
 \membersection{wxColourData::\destruct{wxColourData}}
 
@@ -184,7 +184,7 @@ Destructor.
 Under Windows, determines whether the Windows colour dialog will display the full dialog
 with custom colour selection controls. Has no meaning under other platforms.
 
-The default value is TRUE.
+The default value is true.
 
 \membersection{wxColourData::GetColour}\label{wxcolourdatagetcolour}
 
@@ -210,7 +210,7 @@ The default custom colours are all white.
 Under Windows, tells the Windows colour dialog to display the full dialog
 with custom colour selection controls. Under other platforms, has no effect.
 
-The default value is TRUE.
+The default value is true.
 
 \membersection{wxColourData::SetColour}\label{wxcolourdatasetcolour}
 
