X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..6d3c4b2aee2a64ba3245f2cec9751e4608a9bc3c:/docs/latex/wx/wizpage.tex

diff --git a/docs/latex/wx/wizpage.tex b/docs/latex/wx/wizpage.tex
index 456349c591..ee3e823fda 100644
--- a/docs/latex/wx/wizpage.tex
+++ b/docs/latex/wx/wizpage.tex
@@ -138,7 +138,8 @@ instead.
 
 \membersection{wxWizardPageSimple::wxWizardPageSimple}\label{wxwizardpagesimplewxwizardpagesimple}
 
-\func{}{wxWizardPageSimple}{\param{wxWizard* }{parent = NULL}, \param{wxWizardPage* }{prev = NULL}, \param{wxWizardPage* }{next = NULL}}
+\func{}{wxWizardPageSimple}{\param{wxWizard* }{parent = NULL}, \param{wxWizardPage* }{prev = NULL}, \param{wxWizardPage* }{next = NULL}, 
+\param{const wxBitmap\& }{bitmap = wxNullBitmap}}
 
 Constructor takes the previous and next pages. They may be modified later by
 \helpref{SetPrev()}{wxwizardpagesimplesetprev} or 
@@ -163,6 +164,7 @@ Sets the next page.
 A convenience function to make the pages follow each other.
 
 Example:
+
 \begin{verbatim}
     wxRadioboxPage *page3 = new wxRadioboxPage(wizard);
     wxValidationPage *page4 = new wxValidationPage(wizard);
