X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..566e85f6ec147263f086847e0317f46705924903:/docs/latex/wx/dllload.tex

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index 05dfd62573..5d78bcbc89 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -6,7 +6,7 @@
 %% Created:     02.04.00
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWindows license
+%% License:     wxWidgets license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxDllLoader}}\label{wxdllloader}
@@ -135,8 +135,8 @@ is valid. If the handle is valid, the library must be unloaded later with
 
 \docparam{libname}{Name of the shared object to load.}
 
-\docparam{success}{May point to a bool variable which will be set to TRUE or
-FALSE; may also be {\tt NULL}.}
+\docparam{success}{May point to a bool variable which will be set to true or
+false; may also be {\tt NULL}.}
 
 \membersection{wxDllLoader::UnloadLibrary}\label{wxdllloaderunloadlibrary}
 
