X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..47610ec22ab01dbc09307a88ab67c1c95f6ee3b1:/docs/latex/wx/tsizer.tex

diff --git a/docs/latex/wx/tsizer.tex b/docs/latex/wx/tsizer.tex
index dd32bf4bd8..4f60169188 100644
--- a/docs/latex/wx/tsizer.tex
+++ b/docs/latex/wx/tsizer.tex
@@ -252,10 +252,8 @@ MyDialog::MyDialog(wxFrame *parent, wxWindowID id, const wxString &title )
      0,                // make vertically unstretchable
      wxALIGN_CENTER ); // no border and centre horizontally
 
-  SetAutoLayout( TRUE );     // tell dialog to use sizer
-  SetSizer( topsizer );      // actually set the sizer
+  SetSizer( topsizer );      // use the sizer for layout
 
-  topsizer->Fit( this );            // set size to minimum size as calculated by the sizer
   topsizer->SetSizeHints( this );   // set size hints to honour minimum size
 }
 \end{verbatim}
