X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..27bb2b7cea271d91e272452ff361f948e38dc539:/docs/latex/wx/dataobj.tex

diff --git a/docs/latex/wx/dataobj.tex b/docs/latex/wx/dataobj.tex
index 30ea106eaa..066447ba1b 100644
--- a/docs/latex/wx/dataobj.tex
+++ b/docs/latex/wx/dataobj.tex
@@ -104,6 +104,9 @@ translation under Windows is not yet finished.
 Derive a class from \helpref{wxPyDataObjectSimple}{wxdataobjectsimple} 
 instead.}
 
+\perlnote{This class is not currently usable from wxPerl; you may
+use \helpref{Wx::PlDataObjectSimple}{wxdataobjectsimple} instead.}
+
 \wxheading{Virtual functions to override}
 
 Each class derived directly from wxDataObject must override and implement all
@@ -164,7 +167,7 @@ in list context it returns a list containing all the supported formats.}
 \constfunc{virtual bool}{GetDataHere}{\param{const wxDataFormat\&}{ format}, \param{void }{*buf} }
 
 The method will write the data of the format {\it format} in the buffer {\it
-buf} and return TRUE on success, FALSE on failure.
+buf} and return true on success, false on failure.
 
 \membersection{wxDataObject::GetDataSize}\label{wxdataobjectgetdatasize}
 
@@ -193,5 +196,5 @@ native format of the wxDataObject.
 Set the data in the format {\it format} of the length {\it len} provided in the
 buffer {\it buf}.
 
-Returns TRUE on success, FALSE on failure.
+Returns true on success, false on failure.
 
