X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..2209baaee3a8578450e204593b79ed155f340f68:/docs/latex/wx/imaglist.tex?ds=inline

diff --git a/docs/latex/wx/imaglist.tex b/docs/latex/wx/imaglist.tex
index 8ae464ae15..62b41b6e13 100644
--- a/docs/latex/wx/imaglist.tex
+++ b/docs/latex/wx/imaglist.tex
@@ -28,7 +28,7 @@ wxImageList is used principally in conjunction with \helpref{wxTreeCtrl}{wxtreec
 
 Default constructor.
 
-\func{}{wxImageList}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = TRUE},\rtfsp
+\func{}{wxImageList}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = true},\rtfsp
 \param{int }{initialCount = 1}}
 
 Constructor specifying the image size, whether image masks should be created, and the initial size of the list.
@@ -39,7 +39,7 @@ Constructor specifying the image size, whether image masks should be created, an
 
 \docparam{height}{Height of the images in the list.}
 
-\docparam{mask}{TRUE if masks should be created for all images.}
+\docparam{mask}{true if masks should be created for all images.}
 
 \docparam{initialCount}{The initial size of the list.}
 
@@ -89,7 +89,7 @@ implements the following methods:\par
 }
 \membersection{wxImageList::Create}\label{wximagelistcreate}
 
-\func{bool}{Create}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = TRUE},\rtfsp
+\func{bool}{Create}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = true},\rtfsp
 \param{int }{initialCount = 1}}
 
 Initializes the list. See \helpref{wxImageList::wxImageList}{wximagelistconstr} for details.
@@ -97,8 +97,8 @@ Initializes the list. See \helpref{wxImageList::wxImageList}{wximagelistconstr}
 \membersection{wxImageList::Draw}\label{wximagelistdraw}
 
 \func{bool}{Draw}{\param{int}{ index}, \param{wxDC\&}{ dc}, \param{int }{x},\rtfsp
-\param{int }{x}, \param{int }{flags = wxIMAGELIST\_DRAW\_NORMAL},\rtfsp
-\param{const bool }{solidBackground = FALSE}}
+\param{int }{y}, \param{int }{flags = wxIMAGELIST\_DRAW\_NORMAL},\rtfsp
+\param{const bool }{solidBackground = false}}
 
 Draws a specified image onto a device context.
 
@@ -125,6 +125,18 @@ Draws a specified image onto a device context.
 \docparam{solidBackground}{For optimisation - drawing can be faster if the function is told
 that the background is solid.}
 
+\membersection{wxImageList::GetBitmap}\label{wximagelistgetbitmap}
+
+\constfunc{wxBitmap}{GetBitmap}{\param{int }{index}}
+
+Returns the bitmap corresponding to the given index.
+
+\membersection{wxImageList::GetIcon}\label{wximagelistgeticon}
+
+\constfunc{wxIcon}{GetIcon}{\param{int }{index}}
+
+Returns the icon corresponding to the given index.
+
 \membersection{wxImageList::GetImageCount}\label{wximagelistgetimagecount}
 
 \constfunc{int}{GetImageCount}{\void}
@@ -148,7 +160,7 @@ parameter is ignored as all images in the list have the same size.
 
 \wxheading{Return value}
 
-TRUE if the function succeeded, FALSE if it failed (for example, if the image
+true if the function succeeded, false if it failed (for example, if the image
 list was not yet initialized).
 
 \membersection{wxImageList::Remove}\label{wximagelistremove}
@@ -169,6 +181,8 @@ Removes all the images in the list.
 
 Replaces the existing image with the new image.
 
+Windows only.
+
 \func{bool}{Replace}{\param{int}{ index}, \param{const wxIcon\&}{ icon}}
 
 Replaces the existing image with the new image.
@@ -183,7 +197,7 @@ Replaces the existing image with the new image.
 
 \wxheading{Return value}
 
-TRUE if the replacement was successful, FALSE otherwise.
+true if the replacement was successful, false otherwise.
 
 \wxheading{Remarks}
 
