X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..15d83f726c215b06f2fdd15ece40d66d2f16a01d:/docs/latex/wx/postscpt.tex

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index c901a61772..7e21ae740e 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -1,6 +1,6 @@
 \section{\class{wxPostScriptDC}}\label{wxpostscriptdc}
 
-This defines the wxWindows Encapsulated PostScript device context,
+This defines the wxWidgets Encapsulated PostScript device context,
 which can write PostScript files on any platform. See \helpref{wxDC}{wxdc} for
 descriptions of the member functions.
 
@@ -19,11 +19,11 @@ descriptions of the member functions.
 
 Constructs a PostScript printer device context from a \helpref{wxPrintData}{wxprintdata} object.
 
-\func{}{wxPostScriptDC}{\param{const wxString\& }{output}, \param{bool }{interactive = TRUE},\\
+\func{}{wxPostScriptDC}{\param{const wxString\& }{output}, \param{bool }{interactive = true},\\
   \param{wxWindow *}{parent}}
 
 Constructor. {\it output} is an optional file for printing to, and if
-\rtfsp{\it interactive} is TRUE a dialog box will be displayed for adjusting
+\rtfsp{\it interactive} is true a dialog box will be displayed for adjusting
 various parameters. {\it parent} is the parent of the printer dialog box.
 
 Use the {\it Ok} member to test whether the constructor was successful
