X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2edb0bdef6238c8c246b6978bc14828b7033d931..0032ddbb32de472a9ed5e96879b1a23d70df023a:/docs/latex/wx/inputstr.tex

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index 9c3d8adec6..daf42acc31 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -40,7 +40,7 @@ Returns the first character in the input queue and removes it.
 
 \constfunc{wxInputStream}{Eof}{\void}
 
-Returns TRUE if the end of stream has been reached.
+Returns true if the end of stream has been reached.
 
 \membersection{wxInputStream::LastRead}\label{wxinputstreamlastread}
 
@@ -79,7 +79,7 @@ The data is read until an error is raised by one of the two streams.
 This function returns a reference on the current object, so the user can test
 any states of the stream right away.
 
-\membersection{wxInputStream::SeekI}
+\membersection{wxInputStream::SeekI}\label{wxinputstreamseeki}
 
 \func{off\_t}{SeekI}{\param{off\_t}{ pos}, \param{wxSeekMode}{ mode = wxFromStart}}
 
