X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2e5c594e36341ee6a1f000e7ccbd8537a3ec4643..7f24fdbfeae21875fe73f5aa69aede354baed29b:/docs/latex/wx/filesysh.tex

diff --git a/docs/latex/wx/filesysh.tex b/docs/latex/wx/filesysh.tex
index 4444ef9271..7e0a91ed86 100644
--- a/docs/latex/wx/filesysh.tex
+++ b/docs/latex/wx/filesysh.tex
@@ -118,7 +118,7 @@ This method is only called if \helpref{CanOpen}{wxfilesystemhandlercanopen} retu
 
 Returns next filename that matches parameters passed to \helpref{FindFirst}{wxfilesystemfindfirst}.
 
-This method is only called if \helpref{CanRead}{wxfilesystemhandlercanread} returns TRUE and FindFirst
+This method is only called if \helpref{CanOpen}{wxfilesystemhandlercanopen} returns TRUE and FindFirst
 returned a non-empty string.
 
 \membersection{wxFileSystemHandler::OpenFile}\label{wxfilesystemhandleropenfile}
