X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2cd78b2a875c3b7abd8a9f1025e164124fae0088..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/timer.tex

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index d52233931b..dc7ba28b18 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -37,7 +37,7 @@ be stopped later with \helpref{Stop}{wxtimerstop}.
 
 \wxheading{See also}
 
-\helpref{::wxStartTimer}{wxstarttimer}, \helpref{::wxGetElapsedTime}{wxgetelapsedtime}, \helpref{wxStopWatch}{wxstopwatch}
+\helpref{wxStopWatch}{wxstopwatch}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
