X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2ccd904b011982314b5278044ce5febdee9d7369..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/socket.tex

diff --git a/docs/latex/wx/socket.tex b/docs/latex/wx/socket.tex
index fae16a9068..de3c5c5a88 100644
--- a/docs/latex/wx/socket.tex
+++ b/docs/latex/wx/socket.tex
@@ -127,7 +127,7 @@ Functions to retrieve current state and miscellaneous info.
 \helpref{IsDisconnected}{wxsocketbaseisdisconnected}\\
 \helpref{LastCount}{wxsocketbaselastcount}\\
 \helpref{LastError}{wxsocketbaselasterror}\\
-\helpref{Ok}{wxsocketbaseok}\\
+\helpref{IsOk}{wxsocketbaseisok}\\
 \helpref{SaveState}{wxsocketbasesavestate}\\
 \helpref{RestoreState}{wxsocketbaserestorestate}
 
@@ -414,11 +414,11 @@ be sent to the application. If {\it notify} is false; no events
 will be sent.
 
 % 
-% Ok
+% IsOk
 %
-\membersection{wxSocketBase::Ok}\label{wxsocketbaseok}
+\membersection{wxSocketBase::IsOk}\label{wxsocketbaseisok}
 
-\constfunc{bool}{Ok}{\void}
+\constfunc{bool}{IsOk}{\void}
 
 Returns true if the socket is initialized and ready and false in other
 cases.
@@ -561,11 +561,11 @@ The {\bf wxSOCKET\_REUSEADDR} flag controls the use of the SO\_REUSEADDR standar
 setsockopt() flag. This flag allows the socket to bind to a port that is already in use.
 This is mostly used on UNIX-based systems to allow rapid starting and stopping of a server - 
 otherwise you may have to wait several minutes for the port to become available.
-wxSOCKET_REUSEADDR can also be used with socket clients to (re)bind to a particular local port
+wxSOCKET\_REUSEADDR can also be used with socket clients to (re)bind to a particular local port
 for an outgoing connection.
 This option can have surprising platform dependent behavior, so check the documentation for
 your platform's implementation of setsockopt(). Note that on BSD-based systems (e.g. Mac OS X),
-use of wxSOCKET_REUSEADDR implies SO_REUSEPORT in addition to SO_REUSEADDR to be consistent
+use of wxSOCKET\_REUSEADDR implies SO\_REUSEPORT in addition to SO\_REUSEADDR to be consistent
 with Windows.
 
 So:
@@ -589,7 +589,7 @@ reusing local addresses/ports.
 %
 \membersection{wxSocketBase::SetLocal}\label{wxsocketbasesetlocal}
 
-\func{bool}{SetLocal}{\param{wxSockAddress\&}{ local}}
+\func{bool}{SetLocal}{\param{wxIPV4address\&}{ local}}
 
 This function allows you to set the local address and port,
 useful when an application needs to reuse a particular port. When
