X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/2cb94e7ad66471a655561084056bfc77ccf6d0ac..242019eef3fdcdb12b5310da67af3ef6d15e0f58:/docs/latex/wx/timer.tex

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index fc32e41259..f5d7b52f5f 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -10,7 +10,7 @@ There are three different ways to use this class:
 \item You may derive a new class from wxTimer and override the 
 \helpref{Notify}{wxtimernotify} member to perform the required action.
 \item Or you may redirect the notifications to any 
-\helpref{wxEvtHandler}{wxevthandler} derived object by using the non default
+\helpref{wxEvtHandler}{wxevthandler} derived object by using the non-default
 constructor or \helpref{SetOwner}{wxtimersetowner}. Then use the {\tt EVT\_TIMER} 
 macro to connect it to the event handler which will receive 
 \helpref{wxTimerEvent}{wxtimerevent} notifications.
@@ -29,14 +29,19 @@ be stopped later with \helpref{Stop}{wxtimerstop}.
 \wxheading{Derived from}
 
 \helpref{wxEvtHandler}{wxevthandler}
+\helpref{wxObject}{wxobject}
 
 \wxheading{Include files}
 
 <wx/timer.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
-\helpref{::wxStartTimer}{wxstarttimer}, \helpref{::wxGetElapsedTime}{wxgetelapsedtime}, \helpref{wxStopWatch}{wxstopwatch}
+\helpref{wxStopWatch}{wxstopwatch}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -65,6 +70,20 @@ Destructor. Stops the timer if it is running.
 
 Returns the current interval for the timer (in milliseconds).
 
+\membersection{wxTimer::GetOwner}\label{wxtimergetowner}
+
+\constfunc{wxEvtHandler}{GetOwner}{\void}
+
+Returns the current {\it owner} of the timer.
+If non-\NULL this is the event handler which will receive the 
+\helpref{timer events}{wxtimerevent} when the timer is running.
+
+\membersection{wxTimer::GetId}\label{wxtimergetid}
+
+\constfunc{int}{GetId}{\void}
+
+Returns the ID of the events generated by this timer.
+
 \membersection{wxTimer::IsOneShot}\label{wxtimerisoneshot}
 
 \constfunc{bool}{IsOneShot}{\void}
@@ -123,6 +142,13 @@ restarting it.
 
 Stops the timer.
 
+
+
+
+
+%% wxTimerEvent
+
+
 \section{\class{wxTimerEvent}}\label{wxtimerevent}
 
 wxTimerEvent object is passed to the event handler of timer events.
@@ -157,10 +183,19 @@ void MyFrame::OnTimer(wxTimerEvent& event)
 
 \end{verbatim}
 
+\wxheading{Derived from}
+
+\helpref{wxEvent}{wxevent}\\
+\helpref{wxObject}{wxobject}
+
 \wxheading{Include files}
 
 <wx/timer.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxTimer}{wxtimer}
@@ -173,3 +208,10 @@ void MyFrame::OnTimer(wxTimerEvent& event)
 
 Returns the interval of the timer which generated this event.
 
+
+\membersection{wxTimerEvent::GetTimer}\label{wxtimereventgettimer}
+
+\constfunc{wxTimer\&}{GetTimer}{\void}
+
+Returns the timer object which generated this event.
+
